SELECT * FROM `*nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)
-- Takes: 178.920 ms



Successfully connected to DB 'mysql'

Query error: Table 'test.nucleus_item' doesn't exist

SELECT * FROM `nucleus_item` WHERE `inumber` =  38;
-- Result: Query error: Table 'test.nucleus_item' doesn't exist
-- Takes: 2.527 ms



Query error: Table 'test.nucleus_item' doesn't exist

SELECT * FROM `nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Table 'test.nucleus_item' doesn't exist
-- Takes: 3.806 ms



Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)

SELECT * FROM `*nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)
-- Takes: 5.017 ms



Successfully connected to DB 'mysql'

Query error: Table 'test.nucleus_item' doesn't exist

SELECT * FROM `nucleus_item` WHERE `inumber` =  38;
-- Result: Query error: Table 'test.nucleus_item' doesn't exist
-- Takes: 4.560 ms



Query error: Table 'test.nucleus_item' doesn't exist

SELECT * FROM `nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Table 'test.nucleus_item' doesn't exist
-- Takes: 2.001 ms



Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)

SELECT * FROM `*nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)
-- Takes: 39.903 ms



Successfully connected to DB 'mysql'

Query error: Table 'test.nucleus_item' doesn't exist

SELECT * FROM `nucleus_item` WHERE `inumber` =  38;
-- Result: Query error: Table 'test.nucleus_item' doesn't exist
-- Takes: 2.183 ms



Query error: Table 'test.nucleus_item' doesn't exist

SELECT * FROM `nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Table 'test.nucleus_item' doesn't exist
-- Takes: 2.513 ms



Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)

SELECT * FROM `*nucleus_item` WHERE `inumber` <  38;
-- Result: Query error: Can't find file: '.\test\*nucleus_item.frm' (errno: 22)
-- Takes: 5.509 ms



