OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 1.109 ms
-- 2007-02-02 04:38:34 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 1.492 ms
-- 2007-02-02 04:38:34 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:38:34 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:38:34 

OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 1.565 ms
-- 2007-02-02 04:47:37 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 1.347 ms
-- 2007-02-02 04:47:37 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:47:37 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:47:37 

OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 1.147 ms
-- 2007-02-02 04:47:56 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 1.085 ms
-- 2007-02-02 04:47:56 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:47:56 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:47:57 

OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 0.944 ms
-- 2007-02-02 04:48:23 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 1.258 ms
-- 2007-02-02 04:48:23 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:48:23 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:48:23 

OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 1.039 ms
-- 2007-02-02 04:50:46 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 1.499 ms
-- 2007-02-02 04:50:46 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:50:46 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-02-02 04:50:46 

OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 1.518 ms
-- 2007-03-28 00:45:27 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 6.385 ms
-- 2007-03-28 00:45:27 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-03-28 00:45:27 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-03-28 00:45:27 

OK: connected to DB 'mysql'

OK: SELECT * FROM `mytable` WHERE `inumber` =  38;
-- result: object(DibiMySqlResult) rows: 0
-- takes: 1.124 ms
-- 2007-03-28 01:06:07 

OK: SELECT * FROM `mytable` WHERE `inumber` <  38;
-- result: object(DibiMySqlResult) rows: 12
-- takes: 1.607 ms
-- 2007-03-28 01:06:07 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-03-28 01:06:07 

ERROR: [1064] You have an error in your SQL syntax; check the manual that corresponds to your MySQL server version for the right syntax to use near 'FROM `mytable` WHERE `inumber` <  38' at line 1
-- SQL: SELECT FROM `mytable` WHERE `inumber` <  38;
-- 2007-03-28 01:06:07 

